<!doctype html>
<html lang="en">
  <head>
    <title>404 Page</title>
    <!-- Required meta tags -->
    <meta charset="utf-8">
    <meta name="viewport" content="width=device-width, initial-scale=1, shrink-to-fit=no">

    <!-- Google Font -->
    <link href="https://fonts.googleapis.com/css?family=Sedgwick+Ave" rel="stylesheet">

    <!-- Main Styles-->
    <link rel="stylesheet" href="/dept/cct/apps/meta/styles.css">

    <!-- Bootstrap CSS -->
    <link rel="stylesheet" href="https://stackpath.bootstrapcdn.com/bootstrap/4.3.1/css/bootstrap.min.css" integrity="sha384-ggOyR0iXCbMQv3Xipma34MD+dH/1fQ784/j6cY/iJTQUOhcWr7x9JvoRxT2MZw1T" crossorigin="anonymous">
  </head>
  <body>
      
<header class="rpi-hdr">
  <div class="container">
      <nav class="navbar navbar-expand navbar-dark">
        <a class="navbar-brand rpi-hdr_logo" href="https://rpi.edu">
          <img alt="Rensselaer" src="/dept/cct/apps/meta/img/RPI-Web-Logo-White@2x.png"> 
        </a>
      </nav>
  </div>
</header>

<section id="page-not-found">
  <div class="container">
      <h1 id="fourzerofour" class="big-number outline">
		  404
      </h1>
      <p>Page not found.</p>
      <p> We apologize, we went to the edges of the universe but couldn’t find your page.</p>
  </div>
</section>

<section id="rover">
  <div class="container">
    <div class="parent-wrapper">
      <div class="mars-rover">
          <img class="img-fluid" src="/dept/cct/apps/meta/img/Rover.png"  alt="Mars Rover Prototype">
      </div>
        <div class="rover-text">
            <img src="/dept/cct/apps/meta/img/Arrow.png" alt="">
            <p>Mars Rover prototype designed by RPI students in 1972. Today, RPI alumni are working on the Mars "Curiosity".</p>
        </div>
    </div>
  </div>
</section>

  
<footer class="rpi-footer">
  <div class="container">
    <div class="row">
      <div class="col-lg-4 rpi-seal">
        <img alt="Rensselaer" src="/dept/cct/apps/meta/img/RPI-Web-Seal-White@2x.png">        
        <address>
          <div class="org">Rensselaer Polytechnic Institute</div>
          <div class="addr">
            <div class="street-address">
              110 Eighth Street |
              Troy, NY USA 12180
            </div>
          </div>
          <div class="tel"><a href="tel:15182766000">(518) 276-6000</a></div>
          <div class="contact-us">
            <a href="https://info.rpi.edu/contactus">Contact Us</a>
          </div>
        </address>        
        
      </div>
      
      <div class="col-lg-8">
        <div class="bottom-bit">
          <nav class="nav footer-nav">
  <div class="footer-nav-policies">
    <span>Policies:</span>
    <a class="" target="_blank" href="https://scer.rpi.edu/forjournalists">
      Media</a>
    <a class="" target="_blank" href="https://info.rpi.edu/web-privacy-statement">
      Web Privacy</a>
    <a class="" target="_blank" href="https://sexualviolence.rpi.edu/">
      Title IX</a>
  </div>
  <a class="" target="_blank" href="https://info.rpi.edu/student-consumer-information">
    Student Consumer Information</a>
  <a class="" target="_blank" href="https://info.rpi.edu/statement-of-accessibility">
    Accessibility</a>  
</nav>          <p>
            Copyright © 2020 Rensselaer Polytechnic Institute (RPI)
          </p>  
        </div>
      </div>
    </div>
  </div>
</footer>


    <!-- Optional JavaScript -->
    <!-- jQuery first, then Popper.js, then Bootstrap JS -->
    <script src="https://code.jquery.com/jquery-3.3.1.slim.min.js" integrity="sha384-q8i/X+965DzO0rT7abK41JStQIAqVgRVzpbzo5smXKp4YfRvH+8abtTE1Pi6jizo" crossorigin="anonymous"></script>
    <script src="https://cdnjs.cloudflare.com/ajax/libs/popper.js/1.14.7/umd/popper.min.js" integrity="sha384-UO2eT0CpHqdSJQ6hJty5KVphtPhzWj9WO1clHTMGa3JDZwrnQq4sF86dIHNDz0W1" crossorigin="anonymous"></script>
    <script src="https://stackpath.bootstrapcdn.com/bootstrap/4.3.1/js/bootstrap.min.js" integrity="sha384-JjSmVgyd0p3pXB1rRibZUAYoIIy6OrQ6VrjIEaFf/nJGzIxFDsf4x0xIM+B07jRM" crossorigin="anonymous"></script>
  </body>
</html>
